Fig. 16. Poincaré sections showing the formation of tangle islands at the resonant frequency. (a) f = 0.103; no islands are visible. (b) f = 0.105; very small islands are just forming near the center/bottom and along the separatrices. (c) f = 0.106; the islands, although still small, are more developed. (d) Magnification of tangle islands from Fig. (c).